pop pop pop 122 123

0.26

0.28

0.3

0.32

0.34

0.36

NGC 6946 tdt=84901120

line flux: 0.0173 continuum flux: 15.38 Jy line center: 121.87 line FWHM:0.60 SNR:7.07