pop pop pop 158 159 160 161

1.5

2

2.5

3

3.5

NGC 1365 tdt=76501124 sdir=1

line flux: 1.0360 continuum flux: 141.14 Jy line center: 158.66 line FWHM:0.60 SNR:35.55