pop pop pop 88 90

6.4

6.6

6.8

7

7.2

7.4 NGC 1365 tdt=76501124 sdir=0 det=5

line flux: 0.2305 continuum flux: 178.65 Jy line center: 88.94 line FWHM:0.54 SNR:4.96