pop pop pop 121 122 123 124 125

2.6

2.8

3

3.2

NGC 1365 tdt=76501124 sdir=0

line flux: 0.1727 continuum flux: 144.31 Jy line center: 122.64 line FWHM:0.56 SNR:8.10