pop pop pop 157 158 159 0.2

0.3

0.4

0.5

0.6

0.7

IC 10 tdt=45700606

line flux: 0.2147 continuum flux: 24.37 Jy line center: 157.72 line FWHM:0.59 SNR:43.75