pop pop pop 146 148

1.2

1.25

1.3

1.35

1.4

NGC 6946 tdt=45700139 sdir=0

line flux: 0.0468 continuum flux: 90.61 Jy line center: 145.43 line FWHM:0.65 SNR:5.08