pop pop pop 62 63 64

4

5

6

7

8

NGC 6946 tdt=45700139 sdir=0 & 1 det=1

line flux: 0.5966 continuum flux: 71.20 Jy line center: 63.20 line FWHM:0.27 SNR:5.76