pop pop pop 122 123

0.34

0.36

0.38

0.4

0.42

0.44

NGC 6946 tdt=45100133

line flux: 0.0182 continuum flux: 18.96 Jy line center: 122.01 line FWHM:0.60 SNR:2.87